2172 1938 1704 1470 1236 1002 768 534 300

1234 1010 786 561 337 113 -112 -336 -561

1.000 .875 .750 .625 .500 .375 .250 .125 0.000 Figure 2: Computed solution of sample problem on a 32x128 grid at 1.53 sec. Temperature(deg-K), axial velocity (m/sec), and air mass fraction are shown.

18

2310 2059 1808 1556 1305 1054 801 551 300 Figure 3: Computed temperature (deg-K) of sample problem on a 16x64 grid at .075, .152, .763, and 1.53 sec.