Figure 4: Air bubble rising through water at times t = 0.0s, 0.0101s, 0,0163s, 0,0221s, 0.0286s, 0,0357s, 0,0464s, 0.0591s

Figure 5: Water droplet falling through air onto water surface at times t = 0.0s, 0.00677s, 0.00980s, 0.01220s, 0.01485s, 0.01781s, 0.01995s, 0.02146s